100 120 140 160 180 -30

-20

-10

0

10

20

30 NSCAT data from 311.875 to 312.125

5190 locs 100 120 140 160 180 -30

-20

-10

0

10

20

30 NSCAT data from 312.125 to 312.375

0 locs

100 120 140 160 180 -30

-20

-10

0

10

20

30 NSCAT data from 312.375 to 312.625

4134 locs 100 120 140 160 180 -30

-20

-10

0

10

20

30 NSCAT data from 312.625 to 312.875

1139 locs